Keybase-2   V2.14 ššš Edit Report Template Help šššššššššššššššššššššššššššššššššššššššš

            This template record will be used when searching for a match in the file.
            Commands available - Press the corresponding initial letter key to choose.
EDIT or [^] Places the cursor onto the template for editing the report template.
WRITE (NDX) Write current search pattern to the Aux Drive. (Aux Drive set to NDX or RPT)
WRITE (LST) If the Aux Drive is set to List File (LST) status then search patterns may
            be written as a list, one after another. If set, this List File will now be
            open. Press [W] to write each template. Finally, press [R] to run the file.
            Or set the Aux Drive to (LST) from the Main Menu and press [R] to Run.
LOAD  (NDX) Load a saved SP type search pattern from a file on the Aux Drive.
LOAD  (LST) Not available. List files (FILENAME.LST) may only be RUN, not be loaded.
KEY         Enables you to change the current Key-Index.
RUN         Run the report. Produces a temporary index (FILENAME.NDX) if Aux Drive=(NDX)
DUMP        Use [D] to change from horizontal (columnar) to vertical (label) output.
FIELDS      You may change the number and order of the fields to print out using [F].
ORDER       Toggles the order from normal (0-9, A-Z) to reverse (9-0, Z-A) or back.
TITLES      Switches to vertical (label) output and turns the field titles on or off.
PRINTER     Toggles the printer output on or off. Does not affect the [PTR] key setting.
CPI         Toggles the default print size from standard 12cpi to 17cpi and back.
QUIT        Returns to the Main Menu, keeping any search parameters currently entered.
[ENTER]     Or the [RETURN] key. Enter, clear or amend a report title.

Also...     [S], Search Temporary Index. [I], Set Italic Print. (Not On Extract Module.)
If Editing..[EXIT]=Finish editing. [CUT]=Delete a line. [ALT]+[H]=Editing Help.
, Set Italic Print. (Not On Extract Module.)
If Editing..[EXIT]=Finish editing. [CUT]=Delete 